X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/fc2e9bbfaec8dbe6e317b951c0d28fa2e9421347..bfd36f1f089ac47b1cd51738a5783f58ceba086b:/man/signal-cli-dbus.5.adoc?ds=sidebyside

diff --git a/man/signal-cli-dbus.5.adoc b/man/signal-cli-dbus.5.adoc
index cd73b9f0..732efe43 100644
--- a/man/signal-cli-dbus.5.adoc
+++ b/man/signal-cli-dbus.5.adoc
@@ -68,7 +68,7 @@ This can be piped to a QR encoder to create a display that can be captured by a
 
 For example:
 
-[source]
+[source,bash]
 ----
 dbus-send --session --dest=org.asamk.Signal --type=method_call --print-reply /org/asamk/Signal org.asamk.Signal.link string:"My secondary client" | tr '\n' '\0' | sed 's/.*string //g' | sed 's/\"//g' | qrencode -s10 -tANSI256
 ----
