X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/ec945cd227935470817027b262fc1ddc648cc380..fd8ccae22278dfa63a8ba247937c9a0fcfa3eafb:/man/signal-cli.1.adoc

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 4754d4e5..1a30b2e0 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -93,6 +93,7 @@ The verification should be done over voice, not SMS.
 *--captcha*::
 The captcha token, required if registration failed with a captcha required error.
 To get the token, go to https://signalcaptchas.org/registration/generate.html
+For the staging environment, use: https://signalcaptchas.org/staging/registration/generate.html
 Check the developer tools for a redirect starting with signalcaptcha:// Everything after signalcaptcha:// is the captcha token.
 
 === verify
