X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/ec945cd227935470817027b262fc1ddc648cc380..35679216f701ce3281556471645c5fd11214d457:/man/signal-cli.1.adoc?ds=sidebyside

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 4754d4e5..0562fcca 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -93,6 +93,7 @@ The verification should be done over voice, not SMS.
 *--captcha*::
 The captcha token, required if registration failed with a captcha required error.
 To get the token, go to https://signalcaptchas.org/registration/generate.html
+For the staging environment, use: https://signalcaptchas.org/staging/registration/generate.html
 Check the developer tools for a redirect starting with signalcaptcha:// Everything after signalcaptcha:// is the captcha token.
 
 === verify
@@ -356,6 +357,13 @@ Specify one or more members to make a group admin
 *--remove-admin* [MEMBER [MEMBER ...]]::
 Specify one or more members to remove group admin privileges
 
+*--ban* [MEMBER [MEMBER ...]]::
+Specify one or more members to ban from joining the group.
+Banned members cannot join or request to join via a group link.
+
+*--unban* [MEMBER [MEMBER ...]]::
+Specify one or more members to remove from the ban list
+
 *--reset-link*::
 Reset group link and create new link password
 
