X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/e1134d832a1460cc5e1bcc7edf5e908bf013e0bd..32c4086d1a05bbc02d25cf25ac1067d58836522a:/man/signal-cli.1.adoc?ds=sidebyside

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 3ae54ff0..16b684ea 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -404,6 +404,7 @@ signal-cli -u USERNAME trust -a NUMBER
 * *1*: Error is probably caused and fixable by the user
 * *2*: Some unexpected error
 * *3*: Server or IO error
+* *4*: Sending failed due to untrusted key
 
 == Files
 
