X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/cbff7217c1a3af50fe16aaf37f616c9fd9a8eb44..15da0601272db4b907bf94240b436667870cea87:/man/signal-cli.1.adoc?ds=sidebyside

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 573ade7c..f2a1a960 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -113,6 +113,23 @@ Can fix problems with receiving messages.
 *-n* NAME, *--device-name* NAME::
 Set a new device name for the main or linked device
 
+=== updateConfiguration
+
+Update signal configs and sync them to linked devices.
+This command only works on the main devices.
+
+*--read-receipts* {true,false}::
+Indicates if Signal should send read receipts.
+
+*--unidentified-delivery-indicators* {true,false}::
+Indicates if Signal should show unidentified delivery indicators.
+
+*--typing-indicators* {true,false}::
+Indicates if Signal should send/show typing indicators.
+
+*--link-previews* {true,false}::
+Indicates if Signal should generate link previews.
+
 === setPin
 
 Set a registration lock pin, to prevent others from registering this number.
@@ -127,7 +144,7 @@ Remove the registration lock pin.
 === link
 
 Link to an existing device, instead of registering a new number.
-This shows a "tsdevice:/â¦" URI. If you want to connect to another signal-cli instance, you can just use this URI.
+This shows a "sgnl://linkdevice/?uuid=..." URI. If you want to connect to another signal-cli instance, you can just use this URI.
 If you want to link to an Android/iOS device, create a QR code with the URI (e.g. with qrencode) and scan that in the Signal app.
 
 *-n* NAME, *--name* NAME::
@@ -141,7 +158,8 @@ Only works, if this is the master device.
 
 *--uri* URI::
 Specify the uri contained in the QR code shown by the new device.
-You will need the full uri enclosed in quotation marks, such as "tsdevice:/?uuid=....."
+You will need the full URI such as "sgnl://linkdevice/?uuid=..." (formerly "tsdevice:/?uuid=...")
+Make sure to enclose it in quotation marks for shells.
 
 === listDevices
 
