X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/ba817e2ae4147b201fbb3e5eb8c86e359873ec02..d4838bd646c736a5fe1d40b45aa12be239b01ed3:/man/signal-cli-dbus.5.adoc

diff --git a/man/signal-cli-dbus.5.adoc b/man/signal-cli-dbus.5.adoc
index e7cd083f..594c2941 100755
--- a/man/signal-cli-dbus.5.adoc
+++ b/man/signal-cli-dbus.5.adoc
@@ -363,8 +363,14 @@ uploadStickerPack(stickerPackPath<s>) -> url<s>::
 
 Exception: Failure
 
-== Signals
+submitRateLimitChallenge(challenge<s>, captcha<s>) -> <>::
+* challenge : The challenge token taken from the proof required error.
+* captcha   : The captcha token from the solved captcha on the Signal website..
+Can be used to lift some rate-limits by solving a captcha.
 
+Exception: IOErrorException
+
+== Signalss
 SyncMessageReceived (timestamp<x>, sender<s>, destination<s>, groupId<ay>,message<s>, attachments<as>)::
 The sync message is received when the user sends a message from a linked device.
 
