X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/b382a4260b367311945344715842588f333af0a6..5829e3f117b4297328be3f58e156b45198621a6e:/man/signal-cli.1.adoc?ds=sidebyside

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index aeea729a..7781b1c5 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -313,8 +313,6 @@ The path of the manifest.json or a zip file containing the sticker pack you wish
 === daemon
 
 signal-cli can run in daemon mode and provides an experimental dbus interface.
-For dbus support you need jni/unix-java.so installed on your system (Debian:
-libunixsocket-java ArchLinux: libmatthew-unix-java (AUR)).
 
 *--system*::
 Use DBus system bus instead of user bus.
