X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/abd0e718141bd1d4802f8801e4ae801eaa8efdc7..64af4914ee87067fdab16129535c530171b80766:/man/signal-cli.1.adoc?ds=sidebyside

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index f2a1a960..334f7407 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -144,7 +144,7 @@ Remove the registration lock pin.
 === link
 
 Link to an existing device, instead of registering a new number.
-This shows a "sgnl://linkdevice/?uuid=..." URI. If you want to connect to another signal-cli instance, you can just use this URI.
+This shows a "sgnl://linkdevice?uuid=..." URI. If you want to connect to another signal-cli instance, you can just use this URI.
 If you want to link to an Android/iOS device, create a QR code with the URI (e.g. with qrencode) and scan that in the Signal app.
 
 *-n* NAME, *--name* NAME::
@@ -158,7 +158,7 @@ Only works, if this is the master device.
 
 *--uri* URI::
 Specify the uri contained in the QR code shown by the new device.
-You will need the full URI such as "sgnl://linkdevice/?uuid=..." (formerly "tsdevice:/?uuid=...")
+You will need the full URI such as "sgnl://linkdevice?uuid=..." (formerly "tsdevice:/?uuid=...")
 Make sure to enclose it in quotation marks for shells.
 
 === listDevices
