X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/a48fdaf8b77b068c1049cff8713cf16b0b2c7ddb..1bf703b012521ac8b887be8a50b01bc7b62ce677:/man/signal-cli.1.adoc

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 110f8021..af11a2df 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -71,6 +71,9 @@ Make request via user dbus.
 *--dbus-system*::
 Make request via system dbus.
 
+*--bus-name*::
+Connect to another D-Bus bus name than the default.
+
 *-o* OUTPUT-MODE, *--output* OUTPUT-MODE::
 Specify if you want commands to output in either "plain-text" mode or in "json".
 Defaults to "plain-text"
@@ -746,6 +749,9 @@ See **signal-cli-dbus**(5) for info on the dbus interface.
 Export DBus interface on system bus. +
 See **signal-cli-dbus**(5) for info on the dbus interface.
 
+*--bus-name*::
+Claim another D-Bus bus name than the default.
+
 *--ignore-attachments*::
 Donât download attachments of received messages.
 
