X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/a40810e33e059cb641d1c1512d5da0e2caae8fd9..bea659f9484a2aba47c4d8dad503f18b0aaff19b:/man/signal-cli.1.adoc?ds=inline

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 33f99a6f..110f8021 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -44,6 +44,7 @@ If `--verbose` is also given, the detailed logs will only be written to the log
 
 *--scrub-log*::
 Scrub possibly sensitive information from the log, like phone numbers and UUIDs.
+Doesn't work reliably on dbus logs with very verbose logging (`-vvv`)
 
 *--config* CONFIG::
 Set the path, where to store the config.
