X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/942999b7b4beebf4519eed9b216587519b47e6c6..35679216f701ce3281556471645c5fd11214d457:/man/signal-cli.1.adoc?ds=sidebyside

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 1a30b2e0..0562fcca 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -357,6 +357,13 @@ Specify one or more members to make a group admin
 *--remove-admin* [MEMBER [MEMBER ...]]::
 Specify one or more members to remove group admin privileges
 
+*--ban* [MEMBER [MEMBER ...]]::
+Specify one or more members to ban from joining the group.
+Banned members cannot join or request to join via a group link.
+
+*--unban* [MEMBER [MEMBER ...]]::
+Specify one or more members to remove from the ban list
+
 *--reset-link*::
 Reset group link and create new link password
 
