X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/925d8db468ce39c0e2b164cc1ab464ea2edf4e86..65390ef1d8d3b0d3153197d1843a2def2200855c:/man/signal-cli.1.adoc?ds=inline

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 27f9c82e..67e55bf5 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -89,7 +89,7 @@ REGISTRATION_LOCK_PIN::
     The registration lock PIN, that will be required for new registrations (resets after 7 days of inactivity)
 
 removePin
-~~~~~~
+~~~~~~~~~
 Remove the registration lock pin.
 
 link
