X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/8cd782ef942a2bfd69d6fa56fda5d7b7b3923627..8a74ef5505469176ae360bb72f4db0b9afbb9335:/man/signal-cli.1.adoc

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index cdd56d62..f1e7fca1 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -34,6 +34,7 @@ Options
 
 *--config* CONFIG::
 	Set the path, where to store the config.
+	Make sure you have full read/write access to the given directory.
 	(Default: $HOME/.config/signal)
 
 *-u* USERNAME, *--username* USERNAME::
