X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/6feff1e42b6ec023a48f02bf3b1cd56a6dc5d5d5..c628e27d2e1372c4ed9bc4ee319b83700cd11b17:/man/signal-cli-dbus.5.adoc

diff --git a/man/signal-cli-dbus.5.adoc b/man/signal-cli-dbus.5.adoc
index bc3ad40d..1d78f7f6 100644
--- a/man/signal-cli-dbus.5.adoc
+++ b/man/signal-cli-dbus.5.adoc
@@ -5,6 +5,7 @@ vim:set ts=4 sw=4 tw=82 noet:
 :quotes.~:
 
 = signal-cli-dbus (5)
+:doctype: manpage
 
 == Name
 
