X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/6c3106db5df80a23514864405829d20beb04955f..8ebca0d7fb37489e1b3109519b9ff76067295007:/man/signal-cli.1.adoc?ds=sidebyside

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index b8251eb1..573ade7c 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -110,6 +110,9 @@ CAUTION: Only delete your account if you won't use this number again!
 Update the account attributes on the signal server.
 Can fix problems with receiving messages.
 
+*-n* NAME, *--device-name* NAME::
+Set a new device name for the main or linked device
+
 === setPin
 
 Set a registration lock pin, to prevent others from registering this number.
@@ -359,6 +362,8 @@ Trust all known keys of this user, only use this for testing.
 
 *-v* VERIFIED_SAFETY_NUMBER, *--verified-safety-number* VERIFIED_SAFETY_NUMBER::
 Specify the safety number of the key, only use this option if you have verified the safety number.
+Can be either the plain text numbers shown in the app or the bytes from the QR-code,
+encoded as base64.
 
 === updateProfile
 
