X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/4177deccf1e91483f54c5fcfacffce0ce525ad39..23282fc7e857a7628577cc9b8afb843c7d013007:/man/signal-cli.1.adoc

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 7781b1c5..38e432d5 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -103,7 +103,7 @@ Link another device to this device.
 Only works, if this is the master device.
 
 *--uri* URI::
-Specify the uri contained in the QR code shown by the new device.
+Specify the uri contained in the QR code shown by the new device. You will need the full uri enclosed in quotation marks, such as "tsdevice:/?uuid=....."
 
 === listDevices
 
