X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/404063a080a1a8784a1111304cc6b90b58362923..67146f9cc7a32466efff8c1170d5ac4590987890:/man/signal-cli.1.adoc?ds=sidebyside

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 2104ffc5..b71f549c 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -50,6 +50,11 @@ This flag must not be given for the `link` command.
 It is optional for the `daemon` command.
 For all other commands it is only optional if there is exactly one local user in the config directory.
 
+*--service-environment* ENVIRONMENT
+Choose the server environment to use:
+- `live` (default)
+- `staging`
+
 *--dbus*::
 Make request via user dbus.
 
