X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/2016cf2a5fdf83310d78ca1672a313884880f26e..95678354347faf961f912204479b0aefaf2162db:/man/signal-cli.1.adoc

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index ed498eaf..e73e7cdc 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -135,14 +135,14 @@ You will need the full uri enclosed in quotation marks, such as "tsdevice:/?uuid
 
 === listDevices
 
-Show a list of connected devices.
+Show a list of linked devices.
 
 === removeDevice
 
-Remove a connected device.
+Remove a linked device.
 Only works, if this is the master device.
 
-*-d* DEVICEID, *--device-id* DEVICEID::
+*-d* DEVICE_ID, *--device-id* DEVICE_ID::
 Specify the device you want to remove.
 Use listDevices to see the deviceIds.
 
@@ -293,6 +293,10 @@ In json mode this is outputted as an list of objects and is always in detailed m
 *-d*, *--detailed*::
 Include the list of members of each group and the group invite link.
 
+=== listContacts
+
+Show a list of known contacts with names.
+
 === listIdentities
 
 List all known identity keys and their trust status, fingerprint and safety number.
@@ -447,6 +451,9 @@ signal-cli -u USERNAME updateGroup -n "Group name" -m [MEMBER [MEMBER ...]]
 Add member to a group::
 signal-cli -u USERNAME updateGroup -g GROUP_ID -m "NEW_MEMBER"
 
+Accept a group invitation::
+signal-cli -u USERNAME updateGroup -g GROUP_ID
+
 Leave a group::
 signal-cli -u USERNAME quitGroup -g GROUP_ID
 
