X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/1ea4309a2ac1e1c368f7ce6a3e1b5dcdf0e0635a..4120630309979c1c952691a3b000b79b727a8d39:/man/signal-cli.1.adoc

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index fabca9d4..025ee7ff 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -224,7 +224,6 @@ Specify the recipient group ID in base64 encoding.
 
 *-m* MESSAGE, *--message* MESSAGE::
 Specify the message.
-Currently, signal-cli reads the message from stdin if `-m` is missing, but this will change in a future version and the explicit flag `--message-from-stdin` should be used instead.
 
 *--message-from-stdin*::
 Read the message from standard input.
