X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/109ce26780e48d6a40efe1fc6cdb01a1f0ae1160..2016cf2a5fdf83310d78ca1672a313884880f26e:/man/signal-cli.1.adoc

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index b9a7a9cb..ed498eaf 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -142,7 +142,7 @@ Show a list of connected devices.
 Remove a connected device.
 Only works, if this is the master device.
 
-*-d* DEVICEID, *--deviceId* DEVICEID::
+*-d* DEVICEID, *--device-id* DEVICEID::
 Specify the device you want to remove.
 Use listDevices to see the deviceIds.
 
