X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/0744dcccf117064dcf6c8dbb1312565c0f3e15cb..e36a2f862c996825944927c6e24bf8521edd6edb:/man/signal-cli.1.adoc?ds=sidebyside

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index f1e7fca1..1e412ebb 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -136,6 +136,8 @@ attachments are downloaded to the config directory.
 	Default is 5 seconds.
 *--ignore-attachments*::
 	Donât download attachments of received messages.
+*--json*::
+	Output received messages in json format, one object per line.
 
 updateGroup
 ~~~~~~~~~~~
