X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/0744dcccf117064dcf6c8dbb1312565c0f3e15cb..161ecc877d4d669f78553b4b9837ec877746b483:/man/signal-cli.1.adoc

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index f1e7fca1..1e412ebb 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -136,6 +136,8 @@ attachments are downloaded to the config directory.
 	Default is 5 seconds.
 *--ignore-attachments*::
 	Donât download attachments of received messages.
+*--json*::
+	Output received messages in json format, one object per line.
 
 updateGroup
 ~~~~~~~~~~~
