X-Git-Url: https://git.nmode.ca/signal-cli/blobdiff_plain/00e71ed0fc63959063e79b06bb31da6aa3e71e00..be699cbd859040a2b17a697504899c092d037053:/man/signal-cli.1.adoc?ds=sidebyside

diff --git a/man/signal-cli.1.adoc b/man/signal-cli.1.adoc
index 110f8021..af11a2df 100644
--- a/man/signal-cli.1.adoc
+++ b/man/signal-cli.1.adoc
@@ -71,6 +71,9 @@ Make request via user dbus.
 *--dbus-system*::
 Make request via system dbus.
 
+*--bus-name*::
+Connect to another D-Bus bus name than the default.
+
 *-o* OUTPUT-MODE, *--output* OUTPUT-MODE::
 Specify if you want commands to output in either "plain-text" mode or in "json".
 Defaults to "plain-text"
@@ -746,6 +749,9 @@ See **signal-cli-dbus**(5) for info on the dbus interface.
 Export DBus interface on system bus. +
 See **signal-cli-dbus**(5) for info on the dbus interface.
 
+*--bus-name*::
+Claim another D-Bus bus name than the default.
+
 *--ignore-attachments*::
 Donât download attachments of received messages.
 
